<template>
	<!-- 设备概览 -->
	<view class="overview">
		 功能正在开发中，敬请期待...
		
	</view>
</template>

<script>
	export default {
		data() {
			return {
				// 1.2搜索内容
				search: '',
				
				// 3.设备列表
				deviceList: [
				],
				
				// 配置项
				actionStyle: {
					background: 'hsl(200, 88%, 55%)',
					color: '#fafaff',
					'border-radius': '1vw',
					'line-height': '26px'
				}
			}
		},
		
		created() {
			// this.getList()
		},
		
		methods: {
			async getList() {
				const { data:res } = await this.$http('app/assetBaseList')
				if(res.code) return
				this.deviceList = res.data
			},
			
			
			// 跳转详情页
			toCheck(item) {
				uni.navigateTo({
					url: 'manage_check',
					success: res => {
						res.eventChannel.emit('manage', item)
					}
				})
			}
		}
	}
</script>

<style lang="scss">
	.overview {
		background: #f6f6f6;
		padding: 2.667vw 1vw;
		height: 100vh;
		.search {
			background: #eef;
			display: flex;
			
			.u-icon {
				margin-left: 10px;
			}
		}
		
		// 展示信息
		.main {
			margin: 5.333vw 2.667vw;
			border: 1px solid hsl(200, 98%, 88%);
			border-radius: 1.333vw;
			box-shadow: 1px 1px 2vw hsl(200, 98%, 88%);
			
			position: relative;
			
			.i-spot {
				position: absolute;
				top: 2vw;
				left: 2vw;
			}
			.u-icon{
				position: absolute;
				top: 1.5vw;
				right: 2vw;
			}
			// .u-row:nth-child(2) .u-col {
			// 	border-bottom: 1px solid hsl(200, 98%, 88%);
			// }
			.u-col {
				padding: 1.333vw;
				&:first-child {
					font-weight: bold;
				}
			}
		}
	}
</style>
